1 0 1 0 0 1 0 0 0 1 0 41 0 50123456781st endcapJ/psi + 2nd endcap

R e l a t i v e R a t e M a s s ( G e V ) Figure 15. Simulation of J/y events and pion decay background at

s = 50GeV. The upper (diamond) points are events accepted in the second muonarm with no hadron-absorbing "nosecone" placed before the central magnetpole tip. The lower points show the pion decay background only in the firstmuon arm in the configuration of the PHENIX conceptual design report(includes the nosecone, neutron shield, and Pb photon/electron shield). Thesimulations were performed with PISA[41], using the pion production crosssections from Alper et al.[42].