Central Arm Muon IdentifiersElectron/Photon ArmsFigure 2. Elevation view down the beam axis showing the proposed muonidentifier segments for the central magnet arms. The muon identifiers arelocated outside the concrete shielding enclosure. Also shown is the centralmagnet and selected detail of the dual dectector arms.