00 . 0 4 0 . 0 8 0 . 1 2 0 . 1 6 0 . 0 8 0 . 1 2 0 . 1 6 0 . 2 0 . 2 4

A c c e p t a n c e t1/2Figure 3. Acceptance for three version of the PHENIX muon subsystem;baseline (dotted), 2 endcaps (hatched), 2 endcaps plus central arm muonidentification (solid). The calculations were performed at

s = 50 Γες, βυταρε αππροξιματελψ ϖαλιδ ατ ηιγηερ ενεργιεσ ασ ωελλ δυε το

τ σχαλινγ.